    Delete NIS/NIS+ Server

    This window allows you to delete a highlighted server configuration
    from the NIS and NIS+ Servers list. 

    Note: Enlighten does NOT automatically detect if a server is a
    master or slave/replica server.

    Fields

    This window has the following fields:

    NIS Type

    Use this toggle to specify what type of server to delete, an NIS
    (the default) or NIS+ server.

    Server Type

    Use this toggle to specify what type of server to delete, a Master
    (the default) or Slave/Replica server.

    Domain Name

    Use this field specify the domain name for the server.

    Server

    Use this field specify the hostname of the server.

    Master Host

    You can only use this field if you set the Server Type field to
    Slave/ Replica. If so, you can use this field specify the hostname
    of the NIS/ NIS+ master server.


    Remain as NIS Client

    You can only use this field if you set the Server Type field to
    Slave/ Replica. If so, you can use this toggle to specify if this
    server should remain as an NIS client after deletion. The default is
    Yes.

    Buttons

    This window contains the following buttons:

    Delete

    Click on this button to remove the specified server configuration
    from the NIS and NIS+ Servers list. Enlighten will prompt you to
    confirm your action.

    Close

    Click on this button to discard any changes and close the window.
